ALTER TABLE `#__circolari`
  ADD COLUMN `catid` INT(10) UNSIGNED NOT NULL DEFAULT 0 AFTER `modified_by`,
  ADD INDEX `idx_catid` (`catid`);
  
ALTER TABLE `#__circolari`
  ALTER `catid` SET DEFAULT 11;

-- opzionale, porta a 11 i record con catid 0/null
UPDATE `#__circolari` SET `catid` = 11 WHERE `catid` IS NULL OR `catid` = 0;
